لا توجد تعليمات متاحة.


اسم أو عنوان الجهاز المطبوع إليه بواسطة هذا المنفذ.


أدخل اسم الجماعة المستخدم بواسطة الجهاز المتصل بهذا المنفذ. يتم إتاحته فقط في حالة إتاحة SNMP أيضاً.


أدخل إعدادات بروتوكول RAW. قم بإتاحة هذه الإعدادات من خلال النقر على الزر الدائري RAW في مجموعة بروتوكولات


اسم هذا المنفذ.


اختر البروتوكول الذي يجب أن يستخدمه هذا المنفذ.


أدخل فهرس الجهاز المستخدم بواسطة هذا الجهاز المتصل بهذا المنفذ. يتم إتاحته فقط في حالة إتاحة SNMP أيضاً.


أدخل QName لاستخدامه لهذا المنفذ. يمكن إتاحته بالضغط على الزر الدائري LPR في مجموعة بروتوكول.


اسم هذا المنفذ.


اختر البروتوكول الذي يجب أن يستخدمه هذا المنفذ. بروتوكول LPR.


اختر البروتوكول الذي يجب أن يستخدمه هذا المنفذ. بروتوكول بيانات RAW.


أدخل QName لاستخدامه لهذا المنفذ. يمكن إتاحته بالضغط على الزر الدائري LPR في مجموعة "بروتوكول".


أدخل إعدادات بروتوكول LPR. قم بإتاحته بالضغط الزر الدائري LPR في مجموعة "بروتوكولات".


تأكد هل SNMP مدعوماً للجهاز المتصل بهذا المنفذ.


أدخل فهرس الجهاز المستخدم بواسطة الجهاز المتصل بهذا المنفذ. يتم إتاحته فقط في حالة إتاحة SNMP أيضاً.


اسم أو عنوان الجهاز المطبوع إليه عبر هذا المنفذ.


أدخل اسم الجماعة المستخدم بواسطة الجهاز المتصل بهذا المنفذ. يتم إتاحته فقط في حالة إتاحة SNMP أيضاً.


أدخل رقم منفذ مقابس Berkeley المستخدم للطباعة على هذا المنفذ. يمكن إتاحته بالضغط الزر الدائري RAW في مجموعة بروتوكولات.


تأكد هل SNMP مدعوماً للجهاز المتصل بهذا المنفذ.


أدخل رقم منفذ مقابس Berkeley المستخدم للطباعة على هذا المنفذ. يمكن إتاحته بالضغط الزر الدائري RAW في مجموعة بروتوكولات.


تهيئة كافة منافذ شاشة منفذ TCP/IP القياسي.


إضافة منفذ TCP/IP القياسي.


إضافة منفذ TCP/IP القياسي.


إضافة منفذ TCP/IP القياسي.


عرض وتعديل إعدادات منفذ TCP/IP.


إضافة منفذ TCP/IP القياسي.


تعرض خاصية العد الرقمي عدد الدقائق قبل فترة التوقف عند فشل مهمة الطباعة.


تعرض خاصية العد الرقمي عدد الدقائق قبل فترة التوقف عند فشل مهمة الطباعة.


وقت أقصر قبل فترة التوقف عند فشل الطباعة.


أدخل مقدار الوقت قبل فترة التوقف عند فشل الطباعة.


وقت أطول قبل فترة التوقف عند فشل الطباعة.


عند اختياره سيقوم الكمبيوتر بجمع معلومات عن حالة كل جهاز بصفة دورية.


اضغط في حالة مواجهة مشاكل مثل مستندات مفقودة أو غير كاملة أثناء الطباعة. وعند إتاحة عد بايت LPR، يقوم الكمبيوتر بحساب عدد البايت في المستند قبل إرساله إلى الطابعة. ومعظم الطابعات لا تطالب بعد البايت والذي يمكن أن يكون مستهلك للوقت بطريقة كبيرة. ويتاح هذا الخيار فقط عند اختيار بروتوكول LPR.


أدخل مقدار الوقت قبل فترة التوقف عند فشل الطباعة.