Ohjetta ei ole saatavana.


Laitteen nimi tai osoite, johon tämä portti kirjoittaa.


Anna yhteisönimi, jota tähän porttiin yhdistetty laite käyttää. Käytössä vain, jos myös SNMP on käytössä.


Anna Raaka-protokollaan kuuluvat asetukset. Ota käyttöön napsauttamalla protokollaryhmästä Raaka-valintapainiketta.


Tämän portin nimi.


Valitse protokolla, jota tämän portin tulee käyttää.


Anna laiteindeksi, jota tähän porttiin yhdistetty laite käyttää. Käytössä vain, jos myös SNMP on käytössä.


Anna tämän portin käyttämä jononimi. Voit ottaa sen käyttöön napsauttamalla protokollaryhmän valintapainiketta LPR.


Tämän portin nimi.


Valitse protokolla, jota tämän portin tulee käyttää (LPR-protokolla).


Valitse protokolla, jota tämän portin tulee käyttää (Raaka-dataprotokolla).


Anna tämän portin käyttämä jononimi. Voit ottaa sen käyttöön napsauttamalla protokollaryhmän valintapainiketta LPR.


Anna LPR-protokollalle kuuluvat asetukset. Ota ne käyttöön napsauttamalla protokollaryhmän valintapainiketta LPR.


Tarkista, onko SNMP tuettu tähän porttiin liitetylle laitteelle.


Anna laiteindeksi, jota tähän porttiin yhdistetty laite käyttää. Käytössä vain, jos myös SNMP on käytössä.


Laitteen nimi tai osoite, johon tämä portti kirjoittaa.


Anna yhteisönimi, jota tähän porttiin yhdistetty laite käyttää. Käytössä vain, jos myös SNMP on käytössä.


Anna Berkeley Sockets -porttinumero, jota käytetään tälle portille. Voit tehdä sen napsauttamalla protokollaryhmän valintapainiketta Raaka.


Tarkista, onko SNMP tuettu tähän porttiin liitetylle laitteelle.


Anna Berkeley Sockets -porttinumero, jota käytetään tälle portille. Voit tehdä sen napsauttamalla protokollaryhmän valintapainiketta Raaka.


Määritä kaikki standardit TCP/IP-porttimonitoriportit.


Lisää standardi TCP/IP-portti.


Lisää standardi TCP/IP-portti.


Lisää standardi TCP/IP-portti.


Näytä ja muuta standardin TCP/IP-portin asetuksia.


Lisää standardi TCP/IP-portti.


Digitaalinen lukema näyttää minuutit ennen aikakatkaisua, kun tulostustyö epäonnistuu.


Digitaalinen lukema näyttää minuutit ennen aikakatkaisua, kun tulostustyö epäonnistuu.


Lyhyempi aika ennen aikakatkaisua, kun tulostus epäonnistuu.


Anna aikamäärä ennen aikakatkaisua, jos tulostus epäonnistuu.


Pidempi aika ennen aikakatkaisua, kun tulostus epäonnistuu.


Kun tämä on merkitty, tietokone kyselee aika ajoin tilatietoja kultakin laitteelta.


Napsauta tätä ongelmien ilmetessä, jos esimerkiksi tulostuksesta puuttuu asiakirjoja tai niiden osia. Kun LPR:n tavulasku on käytössä, tietokone laskee asiakirjan tavumäärän ennen asiakirjan lähettämistä kirjoittimelle. Koska tavujen laskeminen voi viedä paljon aikaa, sitä ei vaadita useimmille kirjoittimille. Tätä vaihtoehtoa voidaan käyttää vain LPR-protokollan kanssa.


Anna aikamäärä ennen aikakatkaisua, jos tulostus epäonnistuu.