אין עזרה זמינה.


כתובת ההתקן אליו מתבצעת הדפסה מיציאה זו.


הזן את שם הקהילה (community) המשמש התקן זה, המחובר ליציאה זאת.  מופעל רק כאשר SNMP  מופעל גם כן.


הזן הגדרות המתאימות לפרוטוקול RAW.  אפשר על ידי לחיצה על לחצן המסומן RAW בקבוצת Protocol.


שם יציאה זו.


בחר את הפרוטוקול בו תשתמש היציאה.


הזן את אינדקס ההתקן המשמש התקן זה, המחובר ליציאה זאת.  מופעל רק כאשר SNMP  מופעל גם כן.


הזן את QName שישמש יציאה זו.  ניתן לאפשר זאת על ידי לחיצה על ידי בחירת האפשרות LPR בקבוצת Protocol.


שם יציאה זו.


בחר את הפרוטוקול בו תשתמש היציאה. פרוטוקול LPR.


בחר את הפרוטוקול בו תשתמש היציאה. פרוטוקול RWA Data.


הזן את QName שישמש יציאה זו.  ניתן לאפשר זאת על ידי לחיצה על ידי בחירת האפשרות LPR בקבוצת Protocol.


הזן הגדרות המתאימות לפרוטוקול LPR.  אפשר על ידי לחיצה על לחצן המסומן LPR בקבוצת Protocol.


ודא אם SNMP נתמך עבור התקן המחובר ליציאה זו.


הזן את אינדקס ההתקן המשמש התקן זה, המחובר ליציאה זאת.  מופעל רק כאשר SNMP  מופעל גם כן.


כתובת ההתקן אליו מתבצעת הדפסה מיציאה זו.


הזן את שם הקהילה (community) המשמש התקן זה, המחובר ליציאה זאת.  מופעל רק כאשר SNMP  מופעל גם כן.


הזן את מספר יציאת Berkeley Sockets שישמש יציאה זו.  ניתן לאפשר זאת על ידי לחיצה על ידי בחירת האפשרות RAW בקבוצת Protocol.


ודא אם SNMP נתמך עבור התקן המחובר ליציאה זו.


הזן את מספר יציאת Berkeley Sockets שישמש יציאה זו.  ניתן לאפשר זאת על ידי לחיצה על ידי בחירת האפשרות RAW בקבוצת Protocol.


הגדר תצורה עבור כל היציאות TCP/IP Port Monitor הסטנדרטיות.


הוסף יציאת TCP/IP סטנדרטית.


הוסף יציאת TCP/IP סטנדרטית.


הוסף יציאת TCP/IP סטנדרטית.


צפה ושנה הגדרות עבור יציאת TCP/IP סטנדרטית.


הוסף יציאת TCP/IP סטנדרטית.


תצוגה דיגיטלית המציגה את מספר הדקות לפני ההפסקה, כאשר מתעוררת תקלה בעבודת הדפסה.


תצוגה דיגיטלית המציגה את מספר הדקות לפני ההפסקה, כאשר מתעוררת תקלה בעבודת הדפסה.


זמן קצר יותר לפני ההפסקה בעת תקלות הדפסה.


הזן את פרק הזמן לפני ההפסקה בתקלת הדפסה.


זמן ארוך יותר לפני ההפסקה בעת תקלות הדפסה.


כאשר מסומן, המחשב יתשאל באופן מתוזמן כל התקן לקבלת סטטוס.


לחץ אם תתקל בבעיות כגול תיעוד חסר או לא מושלם, בעת הדפסה. כאשר מופעלת האפשרות לספירת בתי LPR, המחשב סופר את מספר הבתים במסמך לפני שליחתו למדפסת. ספירת בתים, העשוייה לגזול זמן רב, לא נדרשת על ידי רוב המדפסות. האפשרות זמינה רק כאשר נבחר פרוטוקול LPR.


הזן את פרק הזמן לפני ההפסקה בתקלת הדפסה.