hDatabase Preferences
p[1]Default numeric format:
c 25

h
p[2]Number of Key buffers:
n 3,50
10
h
p[6]Default data path:
c 78

h
p[4]Macro file load:
c 78

h
p[3]Automatic load of view:
c 78

h
p[5]Project file to run on entry:
c 78

h
m[7]Encryption driver to use on new files:
1
Standard Alternate
$
