
This command deletes the current custom report definition and
removes it from the list of available reports. 

When you select this command, you will be asked to verify that
you want to delete the highlighted report.  After the custom
report definition has been deleted and its description removed
from the query definitions data base, you will be asked if you
want to purge the report definition list.  This should be done
whenever a report is deleted; however, you must be the only user
accessing the Custom Report subsystem, and hence the query
definitions data base, in order to safely perform this purge.  If
you are not certain that you are the only user of the report
module, defer the purge until a later time. 


