
The SELECT option asks you for the short name (file name) of the
report that you wish to print.  It defaults to the report that was
highlighted, so you can usually just press enter.

If you have the right to modify definitions, you will be asked if
you want to modify the report.  If you select "Y", you are then
taken to the report generator.  For more information on how to
define reports, refer to the Data Base Manual.

After selecting or modifying the report, you will be shown the
number of records about to be printed, and asked to confirm that
you want to print.

You will then be asked for the destination of the report.  You
must select DISK, PRINTER or SCREEN.  If you select DISK, you will
be prompted for the path and file name to print the report to.  If
you select SCREEN the report will be displayed on the screen.  To
actually print the report, select PRINTER.

Next, you will be asked to choose between DETAIL and TOTALS_ONLY.
The TOTALS_ONLY option will only print the sub-totals and report
totals.  It assumes that you have break points on your report.
The actual detail will not be printed unless you select the DETAIL
option.

Finally, you will be prompted for the starting page #, ending page
# and number of copies.  To print the whole report once, press
ENTER at each prompt.  When you are testing a report, you may find
it useful to print the first page only.

You may use the ESC key to back up a step, if you need to correct
any of your entries.


