

The Add Usermode command allows you to define a new user mode.
Enter the name of this new mode, and a new column appears on the
screen.  Users may then be assigned to the new user mode, and menu
items may be disabled or passworded, just as with any other user
mode.

When invoked, the Add Usermode command asks for the short name of
the new user mode.  Then you are prompted to enter a longer, more
detailed description of the user mode.  Next you must select a
previously-defined user mode after which to model this new mode.
Select it from the list provided.  Finally, you are presented
with a pop-up selector, listing all available menu short names.
Choose the one at which you wish users of this new user mode to
begin the system.

Once this data has been entered, you are presented with two
warning messages, and are asked if you want to continue in each
instance.  Take heed of these messages!  If you do not abide by
them, you may irreparably damage your SmartWare application!
These warnings indicate that the files "*.MNU" and "USERMODE.*"
must must be backed up and that you must be the ONLY USER
accessing the system when this command is run.

