
The Switch Usermodes command is extremely useful for testing a
system from different users' perspectives.  This command allows
you to assume the status of a user mode other than your own.
Until you exit, or Switch_Usermodes again, you operate under this
user mode, with all of the privileges and restrictions of that
mode.

To switch back to your original usermode use Ctrl-U to access the
usermode maintenance section and then select Switch_Usermodes.

