Selecting this option will gather information for the user mode
about options for the menus in the system. You will be presented
with the following screen:

..noform
----Menu Options - Main Menu----------------------------------------------------

    User Mode: ADMIN

    Display Help for minimum      # of seconds.
    Display which help:  App  Tech  Text
                         App  = Application Help
                         Tech = Technical Help
                         Text = A Text File
    Text File Name:
    Enter for TEXT help type only
    Auto Load of Macro File:





F3 Previous Field                   F10 Finished
F4 Next Field        Cursor keys    Esc Abandon
..regform

User Mode - This field is used to hold the name of the user mode.
        This is a unique identifier for the user mode and the
        global options associated to it.  This field cannot be
        modified.

Display help for # of seconds - This field is used to hold a
        minimum amount of time to display help for the menu when
        entering it.  A number greater than 0 will display the
        help text as a user enters the menu or view.  Leaving
        this field blank or filling it with 0 will not
        automatically display the help text.  If you enter a
        number such as "10", then the help will be frozen on the
        screen for at least that amount of seconds.

Display which help - This field indicates what type of help the
        users in the selected user mode will receive when
        initially entering the menu or view.  It only has effect
        if a number has been entered into the previous field.

        App  - Application Help
        Tech - Technical Help
        Text - A Text File of specific help created for the user
               mode

Text File - This field holds the name of the text file to be
        displayed if you selected "Text" for the Help to be
        displayed.  When the cursor is on this field, you can use
        the F6 key to access the text editor to editthe message
        or help.

Auto Load of Macro File - This field holds the name of the macro
        file to be loaded when a user of this user mode enters
        the current menu.  The macro definitions are saved in the
        MACRO sub-directory of the HOME directory of the system.
        If you leave this field blank, then the currently loaded
        Macro (if any) will remain in place.  Macros are set with
        the "Macros" selection on the Utilities and Management
        Menu.


