SmartWare Configuration

The System Configuration dialog box gives you control over the application's title, the fonts used by SmartWare for display, and the size of the screen (the number of rows and columns). If the row and column values are set to zero, SmartWare will use the full screen size.

Configuration information is stored in the \SmartWare\OASYS\SMART.INI file.

The recommended video mode is SVGA with a resolution of 800x600. Video drivers can be selected and installed through the Windows Setup icon in the Main group. If you cannot use a driver with an 800x600 resolution and are, instead, using a 640x480 video driver, select the 7x13 sized fonts in the Configuration menu.