hDatabase Preferences
p[1]Default numeric format:
c 25
2r
h
p[2]Number of Key buffers:
n 3,50
10
h
p[6]Default data path:
c 78

h
p[4]Macro file load:
c 78

h
p[3]Automatic load of view:
c 78

h
p[5]Project file to run on entry:
c 78

h
m[7]Encryption driver to use on new files:
1
Standard Alternate
h
p[8]Listen for broadcast server names on this port (BROADCAST_PORT):
n 0,1000000
5595
h
p[9]Timout for listening (in seconds):
n -1,32000
10
h
m[10]Server-Transactions apply to all files from the same server:
1
Yes No
h
p[11]When server is left blank, use this server name:
c 50
faircoms
h
m[12]Make server data-file requests locally:
1
No Yes
p[13]Path to find local copies of server data-files:
c 128

h
m[14]Allow ActiveX updates in command mode:
1
Yes No
$
